\hypertarget{group__cryptographic__constants}{}\doxysection{Cryptographic Contants}
\label{group__cryptographic__constants}\index{Cryptographic Contants@{Cryptographic Contants}}
\doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{group__cryptographic__constants_ga3e258a2c4d9e99eb43a97e7bf1dbe870}\label{group__cryptographic__constants_ga3e258a2c4d9e99eb43a97e7bf1dbe870}} 
const {\bfseries Qore\+::\+Default\+IV} = $<$0000000000000000$>$
\begin{DoxyCompactList}\small\item\em The default initialization vector is simply a 8-\/byte string of nulls. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
Other generic cryptographic constants

\begin{DoxySeeAlso}{See also}
\mbox{\hyperlink{group__crypto__transformations}{Cryptographic Stream Transformations}} for constants related to cryptographic algorithms / 
\end{DoxySeeAlso}
