\hypertarget{group__socket__poll__constants}{}\doxysection{Socket Poll Constants}
\label{group__socket__poll__constants}\index{Socket Poll Constants@{Socket Poll Constants}}
\doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{group__socket__poll__constants_ga75f3b24346b734658a9bcc823efa57ae}\label{group__socket__poll__constants_ga75f3b24346b734658a9bcc823efa57ae}} 
const {\bfseries Qore\+::\+SOCK\+\_\+\+POLLERR} = SOCK\+\_\+\+POLLERR
\begin{DoxyCompactList}\small\item\em (output only) indicates that the socket or connection is closed \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__socket__poll__constants_ga5a36857f12bf9600d8bbab5ed081c364}\label{group__socket__poll__constants_ga5a36857f12bf9600d8bbab5ed081c364}} 
const {\bfseries Qore\+::\+SOCK\+\_\+\+POLLIN} = SOCK\+\_\+\+POLLIN
\begin{DoxyCompactList}\small\item\em (input and output) for polling for read events \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__socket__poll__constants_gab1e74fb9bafa30f1e6bffb0e1de1dfc4}\label{group__socket__poll__constants_gab1e74fb9bafa30f1e6bffb0e1de1dfc4}} 
const {\bfseries Qore\+::\+SOCK\+\_\+\+POLLOUT} = SOCK\+\_\+\+POLLOUT
\begin{DoxyCompactList}\small\item\em (input and output) for polling for write events \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
