\hypertarget{group__breakpoint__policy__options}{}\doxysection{Breakpoint Policy Constants}
\label{group__breakpoint__policy__options}\index{Breakpoint Policy Constants@{Breakpoint Policy Constants}}
\doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{group__breakpoint__policy__options_gaa1a11d070aa6ac6f82c94ac11f2767ff}\label{group__breakpoint__policy__options_gaa1a11d070aa6ac6f82c94ac11f2767ff}} 
const \mbox{\hyperlink{group__breakpoint__policy__options_gaa1a11d070aa6ac6f82c94ac11f2767ff}{Qore\+::\+Breakpoint\+Policy\+Accept}} = BKP\+\_\+\+PO\+\_\+\+ACCEPT
\begin{DoxyCompactList}\small\item\em Consider only threads enumerated in thread list. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__breakpoint__policy__options_gaf37af71a5cae3a7c5335848129732a5a}\label{group__breakpoint__policy__options_gaf37af71a5cae3a7c5335848129732a5a}} 
const \mbox{\hyperlink{group__breakpoint__policy__options_gaf37af71a5cae3a7c5335848129732a5a}{Qore\+::\+Breakpoint\+Policy\+None}} = BKP\+\_\+\+PO\+\_\+\+NONE
\begin{DoxyCompactList}\small\item\em \mbox{\hyperlink{namespace_qore_1_1_thread}{Thread}} list is ignored. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__breakpoint__policy__options_ga8366f69a68ba80c2e6c4e590ffe704cd}\label{group__breakpoint__policy__options_ga8366f69a68ba80c2e6c4e590ffe704cd}} 
const \mbox{\hyperlink{group__breakpoint__policy__options_ga8366f69a68ba80c2e6c4e590ffe704cd}{Qore\+::\+Breakpoint\+Policy\+Reject}} = BKP\+\_\+\+PO\+\_\+\+REJECT
\begin{DoxyCompactList}\small\item\em Consider all thread except those enumerated in thread list. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
These are the possible values that can be passed back to breakpoint as policy related to thread list

\begin{DoxySince}{Since}
Qore 0.\+8.\+13 
\end{DoxySince}
